Folly Beach, SC

79˚ 56' 15"W

79˚ 56' 15"W

79˚ 52' 30"W

79˚ 52' 30"W

79˚ 48' 45"W

79˚ 48' 45"W

32˚ 37' 30"N 32˚ 37' 30"N

32˚ 41' 15"N 32˚ 41' 15"N

0 2 4 6 km

JD 216-225

Side Scan Survey: 1-14 August, 1995

LEGEND

----- JD 216 ----- JD 220 ----- JD 221 ----- JD 222 ----- JD 223 ----- JD 224 ----- JD 225

Mercator Projection Scale 1:150000