Isle of Palms, SC

79˚ 48'W

79˚ 48'W

79˚ 45'W

79˚ 45'W

79˚ 42'W

79˚ 42'W

32˚ 42'N 32˚ 42'N

32˚ 45'N 32˚ 45'N

32˚ 48'N 32˚ 48'N

0 2 4 6 km

JD 055-067

Sidescan: 24 February - 8 March, 1997

Mercator Projection Scale 1:130000

LEGEND

----- JD 060 ----- JD 063 ----- JD 065